CREATE TABLE IF NOT EXISTS `codem_hud_data` (
  `identifier` varchar(65) DEFAULT NULL,
  `data` longtext DEFAULT NULL,
  `stress` int(11) DEFAULT NULL,
  UNIQUE KEY `identifier` (`identifier`) USING HASH
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4;